HTTP/1.1 200 OK Content-Type: text/html Server: Microsoft-IIS/10.0 X-Powered-By: ezEIP X-Frame-Options: SAMEORIGIN Date: Fri, 26 Sep 2025 15:42:29 GMT Content-Length: 0