HTTP/1.1 200 OK Content-Type: text/html Server: Microsoft-IIS/10.0 X-Powered-By: ezEIP X-Frame-Options: SAMEORIGIN Date: Tue, 14 Oct 2025 23:41:58 GMT Content-Length: 0